
   Syntax       %DISPLAY% {%NEAT%|%NORMAL%}

   Purpose      Sets the display in the %NEAT% (two dimensional) or
                %NORMAL% (one dimensional) display mode.  If optional
                reserved words are omitted then AMP will respond with
                the present mode.

   %Example%

   þDISPLAY NEAT

